/* syntax version 1 */
/* postgres can not */
USE plato;

$arg1 = "" || "";
$arg2 = CAST(Unicode::ToUpper("i"u) AS String) || "nput";
$arg3 = CAST(Unicode::ToUpper("i"u) AS String) || "nput";
$arg4 = "" || "";
$arg5 = "" || "raw";

SELECT
    count(*)
FROM RANGE($arg1,$arg2,$arg3,$arg4,$arg5);
