import NoProjectMessage from 'sentry/components/noProjectMessage';
import PageFiltersContainer from 'sentry/components/organizations/pageFilters/container';
import useOrganization from 'sentry/utils/useOrganization';

export default function UptimeContainer({children}: {children?: React.ReactNode}) {
  const organization = useOrganization();

  return (
    <NoProjectMessage organization={organization}>
      <PageFiltersContainer>{children}</PageFiltersContainer>
    </NoProjectMessage>
  );
}
